\input defs.tex
\nopagenumbers
\magnification 1200

\l
1. {\sl Valles de Benasque y Eriste}\par
\line{\hrulefill}
\vskip 1cm

\l
{\bf CLLOT DE CHILL}\l
1 h. 45 min. to 2 h.\vskip 1cm


{\sl Cllot de Chill} is a small valley with a refuge located in the
{\sl Eriste} ({\sl Grist}) valley.

Once in {\sl Eriste} (or {\sl Grist}) take the narrow asphalt road
that departs from the town {\sl Aragonesas}, goes uphill to the pipe of
the power station, and there joins a forest trail, which is usually in
rather good condition. At the end of the trail (1,505 m.) and opposite
the {\sl Espingantosa} waterfall, there is a concrete bridge that
crosses
the river. On the other side you will find a path to the
{\sl Forcan}: \underbar {do not take it}. Before getting there, take
another track on the other side, on the right slope of the mountain
that ascends to the {\sl Cllot de Chill}. After a while, there is a
deviation to the right. The path goes up till you get out of the woods
and see the valley and the refuge.

Beautiful walk highly recommended for the whole family.


\end
