\input defs.tex
\nopagenumbers
\magnification 1200

\l
3. {\sl La Besurta}\par
\line{\hrulefill}
\vskip 1cm

\l
{\bf IB\'ON BAIXO DE BILLAMUERTA}\l
15 minutes\vskip 1cm

The departure point is {\sl Besurta}, located at the end of the tar
trail which originates at the {\sl Hospital of Benasque (Ospital de
Ben\'as)}.

Follow the stream that crosses the trail, as indicated in the map.
Keep walking on its right side  until you reach the
{\sl ib\'on baixo} (lower mountain little lake). Its altitude is 1,940
m. This walk across the fields is easy and pleasant. Appropriate for
families.
\vskip 2cm

\l
{\bf IB\'ON ALTO DE BILLAMUERTA}\l
30 more minutes (but not easy)\vskip 1cm

Once you have arrived at the {\sl ib\'on baixo}, circumvent it on its
left until you get to the ravine. Keep on going uphill following
the stream
to get to the {\sl ib\'on alto} (upper little lake), which is 2,060 m.
high.
This second part of the excursion is rather steep and not appropriate
for small children.
The views
over the peaks {\sl del Perdiguero, la Maladeta} and the {\sl Aneto} are
arresting.


\end
